Babar OEP SLAC 19/11/97

DIRC Fast Monitoring Requir ements

L.Del Buono, L. Roos, M. Zito

Towards a definition of DIRC monitoring quantities...

• Determine grossly what needs to be monitored in the DIRC case

• Calibration related quantities • Simple checks of detector integrity (electronics...) • More complex checks of detector state (PR data...)

• Determine what can be usefully monitored using physics

• No need to be too restrictive, put priorities • Distinguish stand-alone/cross detector quantities • determine interesting physics event classes

• Imagine a basic structur ed model of subdetector monitoring

• what data streams are produced using L1/L3/PR events ? • data storage/archival + user access • what auxiliary informations are necessary (DBs) ?

• Try to write down informations meaningful for central OEP team

• Input data type • Needed event statistics • CPU load: algorithms used to produce monitoring quantities • Data amount to be stored/produced (disk/memory) • Frequency and context of data storing • Database access • ...

infer new requirements for Central OEP...