DIRC OEP Status (5/11/97)

L.Del Buono, L.Roos, M.Zito

• First list of DIRC monitoring histos (Ph ysics runs)

Limited feedback from DIRC people Public since 1 Week: sent to general OEP group (GDF) Do the same for “Long Calibrations” Plan to use simulation to assert some histos validity

• Gain experience fr om sector test in Saclay Real data...

• OEP Framew ork and histogram package installed at Lyon

Begin to play and understand it (still very basic) Connection to DataFlow simulator coming soon Try to put some ‘requirements’ on central OEP group

• Tagged containers ↔ Digi conversion

Gather information L.Del Buono 1 week at LBL after coll. Meet.: start coding ?

Always aim to be operational beginning of 1998 (Saclay system test March 1998)